%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%		LATEX REPORT TEMPLATE
%%%%	
%%%%	Author	: Joost Sijm
%%%%	Contact	: mail@joostsijm.nl
%%%%	Version	: 1.1.1
%%%%
%%%%	Notes	: This code is delivered as is,
%%%%			and without any warranty.
%%%%			Feel free to modify and share.
%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\input{docs/preamble}
\begin{document}

% --------------- COVER PAGE -------------------
\newpage
\pagestyle{fancy}
\fancyhf{}

%------------------ HEAD -----------------------
%\fancyhead[L]{ \includegraphics[scale=0.9]{figs/logo.pdf} }

%------------------ TITLE ----------------------
\vspace*{6cm}
\begin{center}
\Huge  {Big Title}\\
\vspace{1cm}
\huge {Middle Title}\\
\vspace{1cm}
\small {Small Title} \\
\end{center}

%------------------ NAMES ----------------------
\vfill
\begin{flushright}
\begin{tabular}{ll}
Author: & Name Lastname\\
& \today\\
& City, Country.
\end{tabular}
\end{flushright}

%------------- HEADER - FOOTER -----------------
\newpage
\pagestyle{fancy}
\fancyhf{}

%HEADER
\fancyhead[L]{\small \rm \textit{Section \rightmark}}
\fancyhead[R]{\small \rm \textbf{\thepage}}

%FOOTER
\fancyfoot[L]{\small \rm \textit{Footer - Left}}
\fancyfoot[R]{\small \rm \textit{Footer - Right}}

\renewcommand{\sectionmark}[1]{\markright{\thesection.\ #1}}
\renewcommand{\headrulewidth}{0.5pt}
\renewcommand{\footrulewidth}{0.5pt}

%================== INDEX ======================
\tableofcontents
%\listoffigures

% ================ DOCUMENT ====================
\newpage
\input{docs/document}
\input{docs/example}

% =============== References ===================
\newpage
\newpage
\begin{thebibliography}{5}
	\bibitem{cmos} R. Jacob Baker, \textit{CMOS. Circuit Design, Layout, and Simulation}, 2nd ed., USA: IEEE Press, 2005
	
\end{thebibliography}


% ============= End of Document ================
\end{document}

% % ················ IMAGEN ·················
% \begin{figure}[ht!]
% \centering
% \fbox{\includegraphics[scale=0.6]{figs/flujo.png}}
% \caption{Flujo de caja anual}\label{flujo}
% \end{figure}
% %··········································

% % ················ IMAGEN DOBLE ·················
% \begin{figure}[ht!] \centering
% \subfloat[Esquemático]{\includegraphics[scale=0.44]{figs/seguidor.png}}
% \subfloat[Simulación]{\includegraphics[scale=0.45]{figs/seguidor1.png}}
% \caption{Simulación como seguidor de voltaje}\label{seguidor}
% \end{figure}
% %··········································
